
diff -r 000000000000 -r 2c201484c85f cryptomgmtlibs/securitytestfw/eabi/testhandler_on_testexecuteU.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/cryptomgmtlibs/securitytestfw/eabi/testhandler_on_testexecuteU.DEF	Wed Jul 08 11:25:26 2009 +0100
@@ -0,0 +1,10 @@
+EXPORTS
+	_ZN20TestExecuteInterface19StartWinsEka1ThreadEPFivERK7TDesC16 @ 1 NONAME
+	_ZN20TestExecuteInterface21StartWithTestExecuteLEP12TScriptTestsRK7TDesC16 @ 2 NONAME
+	_ZTIN20TestExecuteInterface12CStepConsoleE @ 3 NONAME ; #<TI>#
+	_ZTIN20TestExecuteInterface5CStepE @ 4 NONAME ; #<TI>#
+	_ZTIN20TestExecuteInterface7CServerE @ 5 NONAME ; #<TI>#
+	_ZTVN20TestExecuteInterface12CStepConsoleE @ 6 NONAME ; #<VT>#
+	_ZTVN20TestExecuteInterface5CStepE @ 7 NONAME ; #<VT>#
+	_ZTVN20TestExecuteInterface7CServerE @ 8 NONAME ; #<VT>#
+




