
diff -r 3406c99bc375 -r 07b41fa8d1dd stif/TestCombiner/eabi/testcombineru.def
--- a/stif/TestCombiner/eabi/testcombineru.def	Thu Jul 15 20:25:38 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,3 +0,0 @@
-EXPORTS
-	_Z9LibEntryLv @ 1 NONAME
-




