
diff -r 41f0cfe18c80 -r c734af59ce98 kernel/eka/bx86/ekernsmp.def
--- a/kernel/eka/bx86/ekernsmp.def	Tue Apr 27 18:02:57 2010 +0300
+++ b/kernel/eka/bx86/ekernsmp.def	Tue May 11 17:28:22 2010 +0300
@@ -1004,4 +1004,12 @@
 	?RandomSalt@Kern@@SAX_KI@Z @ 1003 NONAME ; public: static void __cdecl Kern::RandomSalt(unsigned __int64,unsigned int)
 	?RandomSalt@Kern@@SAXPBEII@Z @ 1004 NONAME ; void Kern::RandomSalt(unsigned char const *, unsigned int, unsigned int)
 	?SecureRandom@Kern@@SAHAAVTDes8@@@Z @ 1005 NONAME ; int Kern::SecureRandom(class TDes8 &)
+	?NotificationLock@DPagingDevice@@QAEPAVNFastMutex@@XZ @ 1006 NONAME ; public: class NFastMutex * __thiscall DPagingDevice::NotificationLock(void)
+	?Configure@KernCoreStats@@SAHI@Z @ 1007 NONAME ABSENT ;  public: static int KernCoreStats::Configure(unsigned int)
+	?Engage@KernCoreStats@@SAHH@Z @ 1008 NONAME ABSENT	;  public: static int KernCoreStats::Engage(int)
+	?Retire@KernCoreStats@@SAHHH@Z @ 1009 NONAME ABSENT	;  public: static int KernCoreStats::Retire(int, int)
+	?Stats@KernCoreStats@@SAHPAX@Z @ 1010 NONAME ABSENT	;  public: static int KernCoreStats::Stats(void *)
+	?SetNumberOfActiveCpus@NKern@@SAXH@Z @ 1011 NONAME ABSENT ; public: static void __cdecl NKern::SetNumberOfActiveCpus(int)
+	?FreeRamZone@Epoc@@SAHI@Z @ 1012 NONAME ABSENT ; public: static int Epoc::FreeRamZone(unsigned int)
+	?SelectiveAlloc@TBitMapAllocator@@QAEIHH@Z @ 1013 NONAME ; public: unsigned int __thiscall TBitMapAllocator::SelectiveAlloc(int,int)
 




