
diff -r 000000000000 -r 96e5fb8b040d kernel/eka/bmarm/exmoncommonu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/kernel/eka/bmarm/exmoncommonu.def	Thu Dec 17 09:24:54 2009 +0200
@@ -0,0 +1,39 @@
+EXPORTS
+	__7Monitor @ 1 NONAME R3UNUSED ; Monitor::Monitor(void)
+	DisplayCpuFaultInfo__7Monitor @ 2 NONAME R3UNUSED ; Monitor::DisplayCpuFaultInfo(void)
+	DisplayFaultInfo__7Monitor @ 3 NONAME R3UNUSED ; Monitor::DisplayFaultInfo(void)
+	DoDiscontiguousMemoryDumpL__7MonitorUii @ 4 NONAME R3UNUSED ; Monitor::DoDiscontiguousMemoryDumpL(unsigned int, int)
+	DoMemoryDumpL__7MonitorUii @ 5 NONAME R3UNUSED ; Monitor::DoMemoryDumpL(unsigned int, int)
+	DumpCpuRegisters__7Monitor @ 6 NONAME R3UNUSED ; Monitor::DumpCpuRegisters(void)
+	DumpCpuThreadData__7MonitorP7DThread @ 7 NONAME R3UNUSED ; Monitor::DumpCpuThreadData(DThread *)
+	DumpObjectContainer__7MonitorUii @ 8 NONAME R3UNUSED ; Monitor::DumpObjectContainer(unsigned int, int)
+	Entry__7MonitorPv @ 9 NONAME R3UNUSED ; Monitor::Entry(void *)
+	HandleException__7Monitor @ 10 NONAME R3UNUSED ; Monitor::HandleException(void)
+	Leave__7Monitori @ 11 NONAME R3UNUSED ; Monitor::Leave(int)
+	NewLine__7Monitor @ 12 NONAME R3UNUSED ; Monitor::NewLine(void)
+	ObjectDump__7MonitorUi @ 13 NONAME R3UNUSED ; Monitor::ObjectDump(unsigned int)
+	ObjectFullDump__7MonitorUi @ 14 NONAME R3UNUSED ; Monitor::ObjectFullDump(unsigned int)
+	PrintLine__7MonitorPCc @ 15 NONAME R3UNUSED ; Monitor::PrintLine(char const *)
+	PrintLine__7MonitorRC6TDesC8 @ 16 NONAME R3UNUSED ; Monitor::PrintLine(TDesC8 const &)
+	Print__7MonitorPCc @ 17 NONAME R3UNUSED ; Monitor::Print(char const *)
+	Printf__7MonitorPCce @ 18 NONAME ; Monitor::Printf(char const *,...)
+	ProcessError__7Monitori @ 19 NONAME R3UNUSED ; Monitor::ProcessError(int)
+	ProcessInfoCommand__7MonitorRC6TDesC8Ri @ 20 NONAME R3UNUSED ; Monitor::ProcessInfoCommand(TDesC8 const &, int &)
+	RegisterMonitorImpl__7MonitorP7Monitor @ 21 NONAME R3UNUSED ; Monitor::RegisterMonitorImpl(Monitor *)
+	Trap__6TTrapMRi @ 22 NONAME R3UNUSED ; TTrapM::Trap(int &)
+	UnTrap__6TTrapM @ 23 NONAME R3UNUSED ; TTrapM::UnTrap(void)
+	CpuInit__7Monitor @ 24 NONAME R3UNUSED ; Monitor::CpuInit(void)
+	Pause__7Monitori @ 25 NONAME R3UNUSED ; Monitor::Pause(int)
+	DumpThreadStack__7MonitorP7DThread @ 26 NONAME R3UNUSED ; Monitor::DumpThreadStack(DThread *)
+	DumpThreadStacks__7Monitori @ 27 NONAME R3UNUSED ; Monitor::DumpThreadStacks(int)
+	DisplayCodeSeg__7MonitorP8DCodeSegi @ 28 NONAME R3UNUSED ; Monitor::DisplayCodeSeg(DCodeSeg*, int)
+	DisplayCodeSeg__7Monitori @ 29 NONAME R3UNUSED ; Monitor::DisplayCodeSeg(int)
+	DoDiscontiguousMemoryDumpL__7MonitorUiiUi @ 30 NONAME ; Monitor::DoDiscontiguousMemoryDumpL(unsigned int, int, unsigned int)
+	DoMemoryDumpL__7MonitorUiiUi @ 31 NONAME ; Monitor::DoMemoryDumpL(unsigned int, int, unsigned int)
+	DumpExceptionStacks__7Monitor @ 32 NONAME R3UNUSED ; Monitor::DumpExceptionStacks(void)
+	SwitchAddressSpace__7MonitorP8DProcessi @ 33 NONAME R3UNUSED ; Monitor::SwitchAddressSpace(DProcess*, int)
+	CrashTime__Fv @ 34 NONAME R3UNUSED ; CrashTime(void)
+	DisplayNThreadInfo__7MonitorP7NThread @ 35 NONAME R3UNUSED ; Monitor::DisplayNThreadInfo(NThread *)
+	GetStackPointers__7MonitorP7NThreadRUiT2 @ 36  NONAME ; Monitor::GetStackPointers(NThread *, unsigned int &, unsigned int &)
+	MapAndLocateUserStack__7MonitorP7DThread @ 37  NONAME R3UNUSED ; Monitor::MapAndLocateUserStack(DThread *)	
+




