EXPORTS
	CreateLogicalDevice__Fv @ 1 NONAME R3UNUSED ; CreateLogicalDevice(void)
	DebugPortChanged__18CloggerDebugRouterv @ 2 NONAME R3UNUSED ; CloggerDebugRouter::DebugPortChanged(void)
	KChunkSize @ 3 NONAME ; (null)
	KEnableEarlyRdebug @ 4 NONAME ; (null)
	KIsrBufSize @ 5 NONAME ; (null)
	SetCrashDumpFunctions__18CloggerDebugRouterPFPvUiRQ218CloggerDebugRouter14SCrashDumpArea_vPFRQ218CloggerDebugRouter14SCrashDumpArea_v @ 6 NONAME R3UNUSED ; CloggerDebugRouter::SetCrashDumpFunctions(void (*)(void *, unsigned int, CloggerDebugRouter::SCrashDumpArea &), void (*)(CloggerDebugRouter::SCrashDumpArea &))

