
diff -r 000000000000 -r 7f656887cf89 libraries/qr3/BMARM/LoggingAllocatorU.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/libraries/qr3/BMARM/LoggingAllocatorU.DEF	Wed Jun 23 15:52:26 2010 +0100
@@ -0,0 +1,8 @@
+EXPORTS
+	Install__17RLoggingAllocator @ 1 NONAME R3UNUSED ; RLoggingAllocator::Install(void)
+	Uninstall__17RLoggingAllocator @ 2 NONAME R3UNUSED ; RLoggingAllocator::Uninstall(void)
+	Install__17RLoggingAllocatorUi @ 3 NONAME R3UNUSED ; RLoggingAllocator::Install(unsigned int)
+	New__17RLoggingAllocatorUiP10RAllocatorRP17RLoggingAllocator @ 4 NONAME R3UNUSED ; RLoggingAllocator::New(unsigned int, RAllocator *, RLoggingAllocator *&)
+	StaticTraceAlloc__17RLoggingAllocatorP10RAllocatorPvi @ 5 NONAME R3UNUSED ; RLoggingAllocator::StaticTraceAlloc(RAllocator *, void *, int)
+	StaticTraceFree__17RLoggingAllocatorP10RAllocatorPv @ 6 NONAME R3UNUSED ; RLoggingAllocator::StaticTraceFree(RAllocator *, void *)
+




