
diff -r 79859ed3eea9 -r 919f36ff910f webengine/osswebengine/npscript/group/EABI/npscriptu.def
--- a/webengine/osswebengine/npscript/group/EABI/npscriptu.def	Tue Aug 31 16:17:46 2010 +0300
+++ b/webengine/osswebengine/npscript/group/EABI/npscriptu.def	Wed Sep 01 12:28:30 2010 +0100
@@ -17,4 +17,5 @@
 	NPN_RetainObject @ 16 NONAME
 	NPN_SetProperty @ 17 NONAME
 	NPN_UTF8FromIdentifier @ 18 NONAME
+	NPN_SetException @ 19 NONAME
 




