
diff -r 000000000000 -r 2014ca87e772 imagehandling_plat/thumbnailmanager_api/tsrc/Bmarm/ThumbnailManagerTestU.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/imagehandling_plat/thumbnailmanager_api/tsrc/Bmarm/ThumbnailManagerTestU.DEF	Tue Jan 26 15:18:05 2010 +0200
@@ -0,0 +1,3 @@
+EXPORTS
+	LibEntryL__FR13CTestModuleIf @ 1 NONAME R3UNUSED ; LibEntryL(CTestModuleIf &)
+




