EXPORTS
	?StartConsoleAlarmAlertServerL@ConsoleAlarmAlertServer@@SAXPAX@Z @ 1 NONAME ; public: static void __cdecl ConsoleAlarmAlertServer::StartConsoleAlarmAlertServerL(void *)

