
diff -r d07aa956024a -r 030c4fbc13d7 authenticationservices/authenticationserver/test/securitytests/eabi/authsecuritytestsU.def
--- a/authenticationservices/authenticationserver/test/securitytests/eabi/authsecuritytestsU.def	Thu Apr 01 00:24:41 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,15 +0,0 @@
-EXPORTS
-	_Z21CapabilityTestFactoryv @ 1 NONAME
-	_ZTI21CAuthTrustedUISecTest @ 2 NONAME
-	_ZTI24CAuthReadUserDataSecTest @ 3 NONAME
-	_ZTI25CAuthWriteUserDataSecTest @ 4 NONAME
-	_ZTI26CAuthReadDeviceDataSecTest @ 5 NONAME
-	_ZTI27CAuthWriteDeviceDataSecTest @ 6 NONAME
-	_ZTI33CAuthReadUserAndDeviceDataSecTest @ 7 NONAME
-	_ZTV21CAuthTrustedUISecTest @ 8 NONAME
-	_ZTV24CAuthReadUserDataSecTest @ 9 NONAME
-	_ZTV25CAuthWriteUserDataSecTest @ 10 NONAME
-	_ZTV26CAuthReadDeviceDataSecTest @ 11 NONAME
-	_ZTV27CAuthWriteDeviceDataSecTest @ 12 NONAME
-	_ZTV33CAuthReadUserAndDeviceDataSecTest @ 13 NONAME
-




