
diff -r f5d4820de50d -r 4fde310f06fe stif/TestServer/eabi/StifTestServeru.def
--- a/stif/TestServer/eabi/StifTestServeru.def	Tue May 25 18:01:01 2010 +0300
+++ b/stif/TestServer/eabi/StifTestServeru.def	Mon Jun 14 11:37:33 2010 +0300
@@ -60,4 +60,5 @@
 	_ZN14RTestExecution14NotifyCommand2ER5TPckgI8TCommandER5TDes8R14TRequestStatusi @ 59 NONAME
 	_ZTI11CCommandDef @ 60 NONAME ; #<TI>#
 	_ZTV11CCommandDef @ 61 NONAME ; #<VT>#
+	_ZN14RTestExecution11RunTestCaseER5TPckgI15TFullTestResultERK7TDesC16R14TRequestStatus @ 62 NONAME
 




