
diff -r f5d4820de50d -r 4fde310f06fe stif/TestInterface/BMARM/StifTestInterfaceu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/stif/TestInterface/BMARM/StifTestInterfaceu.def	Mon Jun 14 11:37:33 2010 +0300
@@ -0,0 +1,122 @@
+EXPORTS
+	__9TTestInfo @ 1 NONAME R3UNUSED ; TTestInfo::TTestInfo(void)
+	Append__14CStifTFwIfProtPFi_7TPtrC16i @ 2 NONAME R3UNUSED ; CStifTFwIfProt::Append(TPtrC16 (*)(int), int)
+	Append__14CStifTFwIfProtPFi_7TPtrC16iRC7TDesC16 @ 3 NONAME ; CStifTFwIfProt::Append(TPtrC16 (*)(int), int, TDesC16 const &)
+	Append__14CStifTFwIfProtPFi_7TPtrC16iT1i @ 4 NONAME ; (null)
+	Append__14CStifTFwIfProtPFi_7TPtrC16ii @ 5 NONAME ; CStifTFwIfProt::Append(TPtrC16 (*)(int), int, int)
+	Append__14CStifTFwIfProtRC7TDesC16 @ 6 NONAME R3UNUSED ; CStifTFwIfProt::Append(TDesC16 const &)
+	CallTestClass__11CScriptBaseRC7TDesC16 @ 7 NONAME R3UNUSED ; CScriptBase::CallTestClass(TDesC16 const &)
+	CancelEvent__13CTestModuleIfR8TEventIfP14TRequestStatus @ 8 NONAME R3UNUSED ; CTestModuleIf::CancelEvent(TEventIf &, TRequestStatus *)
+	CancelSignal__11CScriptBase @ 9 NONAME R3UNUSED ; CScriptBase::CancelSignal(void)
+	CheckAllowResult__13CTestModuleIfi @ 10 NONAME R3UNUSED ; CTestModuleIf::CheckAllowResult(int)
+	CmdType__14CStifTFwIfProti @ 11 NONAME R3UNUSED ; CStifTFwIfProt::CmdType(int)
+	CreateL__14CStifTFwIfProti @ 12 NONAME R3UNUSED ; CStifTFwIfProt::CreateL(int)
+	CreationResult__11CStifLogger @ 13 NONAME R3UNUSED ; CStifLogger::CreationResult(void)
+	DstDevId__14CStifTFwIfProt @ 14 NONAME R3UNUSED ; CStifTFwIfProt::DstDevId(void)
+	DstId__14CStifTFwIfProt @ 15 NONAME R3UNUSED ; CStifTFwIfProt::DstId(void)
+	DstTestId__14CStifTFwIfProt @ 16 NONAME R3UNUSED ; CStifTFwIfProt::DstTestId(void)
+	EnableSignal__11CScriptBaseR14TRequestStatus @ 17 NONAME R3UNUSED ; CScriptBase::EnableSignal(TRequestStatus &)
+	EventStatusParams__14CStifTFwIfProti @ 18 NONAME R3UNUSED ; CStifTFwIfProt::EventStatusParams(int)
+	EventStatus__14CStifTFwIfProti @ 19 NONAME R3UNUSED ; CStifTFwIfProt::EventStatus(int)
+	EventType__14CStifTFwIfProti @ 20 NONAME R3UNUSED ; CStifTFwIfProt::EventType(int)
+	Event__13CTestModuleIfR8TEventIf @ 21 NONAME R3UNUSED ; CTestModuleIf::Event(TEventIf &)
+	Event__13CTestModuleIfR8TEventIfR14TRequestStatus @ 22 NONAME R3UNUSED ; CTestModuleIf::Event(TEventIf &, TRequestStatus &)
+	GetChar__15CStifItemParserRC7TDesC16R5TChar @ 23 NONAME R3UNUSED ; CStifItemParser::GetChar(TDesC16 const &, TChar &)
+	GetInt__15CStifItemParserRC7TDesC16RUi6TRadix @ 24 NONAME ; CStifItemParser::GetInt(TDesC16 const &, unsigned int &, TRadix)
+	GetInt__15CStifItemParserRC7TDesC16Ri @ 25 NONAME R3UNUSED ; CStifItemParser::GetInt(TDesC16 const &, int &)
+	GetItemLineL__18CStifSectionParserRC7TDesC1617TTagToReturnValue @ 26 NONAME R3UNUSED ; CStifSectionParser::GetItemLineL(TDesC16 const &, TTagToReturnValue)
+	GetLine__18CStifSectionParserRC7TDesC16R7TPtrC1617TTagToReturnValue @ 27 NONAME ; CStifSectionParser::GetLine(TDesC16 const &, TPtrC16 &, TTagToReturnValue)
+	GetMeasurementOptions__13CTestModuleIfRi @ 28 NONAME R3UNUSED ; CTestModuleIf::GetMeasurementOptions(int &)
+	GetNextChar__15CStifItemParserR5TChar @ 29 NONAME R3UNUSED ; CStifItemParser::GetNextChar(TChar &)
+	GetNextChar__15CStifItemParserRC7TDesC16R5TChar @ 30 NONAME R3UNUSED ; CStifItemParser::GetNextChar(TDesC16 const &, TChar &)
+	GetNextInt__15CStifItemParserRC7TDesC16RUi6TRadix @ 31 NONAME ; CStifItemParser::GetNextInt(TDesC16 const &, unsigned int &, TRadix)
+	GetNextInt__15CStifItemParserRC7TDesC16Ri @ 32 NONAME R3UNUSED ; CStifItemParser::GetNextInt(TDesC16 const &, int &)
+	GetNextInt__15CStifItemParserRUi6TRadix @ 33 NONAME R3UNUSED ; CStifItemParser::GetNextInt(unsigned int &, TRadix)
+	GetNextInt__15CStifItemParserRi @ 34 NONAME R3UNUSED ; CStifItemParser::GetNextInt(int &)
+	GetNextItemLineL__18CStifSectionParser @ 35 NONAME R3UNUSED ; CStifSectionParser::GetNextItemLineL(void)
+	GetNextItemLineL__18CStifSectionParserRC7TDesC1617TTagToReturnValue @ 36 NONAME R3UNUSED ; CStifSectionParser::GetNextItemLineL(TDesC16 const &, TTagToReturnValue)
+	GetNextLine__18CStifSectionParserR7TPtrC16 @ 37 NONAME R3UNUSED ; CStifSectionParser::GetNextLine(TPtrC16 &)
+	GetNextLine__18CStifSectionParserRC7TDesC16R7TPtrC1617TTagToReturnValue @ 38 NONAME ; CStifSectionParser::GetNextLine(TDesC16 const &, TPtrC16 &, TTagToReturnValue)
+	GetNextString__15CStifItemParserR7TPtrC16 @ 39 NONAME R3UNUSED ; CStifItemParser::GetNextString(TPtrC16 &)
+	GetNextString__15CStifItemParserRC7TDesC16R7TPtrC16 @ 40 NONAME R3UNUSED ; CStifItemParser::GetNextString(TDesC16 const &, TPtrC16 &)
+	GetPosition__18CStifSectionParser @ 41 NONAME R3UNUSED ; CStifSectionParser::GetPosition(void)
+	GetStoredState__13CTestModuleIfRiRt4TBuf1i128 @ 42 NONAME R3UNUSED ; CTestModuleIf::GetStoredState(int &, TBuf<128> &)
+	GetString__15CStifItemParserRC7TDesC16R7TPtrC16 @ 43 NONAME R3UNUSED ; CStifItemParser::GetString(TDesC16 const &, TPtrC16 &)
+	GetTestObject__11CScriptBaseRC7TDesC16 @ 44 NONAME R3UNUSED ; CScriptBase::GetTestObject(TDesC16 const &)
+	Log__11CStifLoggerGt11TRefByValue1ZC6TDesC8e @ 45 NONAME ; CStifLogger::Log(TRefByValue<TDesC8 const>,...)
+	Log__11CStifLoggerGt11TRefByValue1ZC7TDesC16e @ 46 NONAME ; CStifLogger::Log(TRefByValue<TDesC16 const>,...)
+	Log__11CStifLoggerRC6TDesC8 @ 47 NONAME R3UNUSED ; CStifLogger::Log(TDesC8 const &)
+	Log__11CStifLoggerRC7TDesC16 @ 48 NONAME R3UNUSED ; CStifLogger::Log(TDesC16 const &)
+	Log__11CStifLoggeriGt11TRefByValue1ZC6TDesC8e @ 49 NONAME ; CStifLogger::Log(int, TRefByValue<TDesC8 const>,...)
+	Log__11CStifLoggeriGt11TRefByValue1ZC7TDesC16e @ 50 NONAME ; CStifLogger::Log(int, TRefByValue<TDesC16 const>,...)
+	Log__11CStifLoggeriRC6TDesC8 @ 51 NONAME R3UNUSED ; CStifLogger::Log(int, TDesC8 const &)
+	Log__11CStifLoggeriRC7TDesC16 @ 52 NONAME R3UNUSED ; CStifLogger::Log(int, TDesC16 const &)
+	MsgType__14CStifTFwIfProti @ 53 NONAME R3UNUSED ; CStifTFwIfProt::MsgType(int)
+	NewL__11CStifLoggerRC7TDesC16T1Q211CStifLogger11TLoggerTypeQ211CStifLogger7TOutputiiiiiiii @ 54 NONAME ; CStifLogger::NewL(TDesC16 const &, TDesC16 const &, CStifLogger::TLoggerType, CStifLogger::TOutput, int, int, int, int, int, int, int, int)
+	NewL__11CStifLoggerRC7TDesC16T1R15TLoggerSettings @ 55 NONAME R3UNUSED ; CStifLogger::NewL(TDesC16 const &, TDesC16 const &, TLoggerSettings &)
+	NewL__11CStifParserRC7TDesC16Q211CStifParser12TCommentType @ 56 NONAME R3UNUSED ; CStifParser::NewL(TDesC16 const &, CStifParser::TCommentType)
+	NewL__11CStifParserRC7TDesC16T1Q211CStifParser12TCommentType @ 57 NONAME R3UNUSED ; CStifParser::NewL(TDesC16 const &, TDesC16 const &, CStifParser::TCommentType)
+	NewL__13CTestModuleIfP20CTestThreadContainerP15CTestModuleBase @ 58 NONAME R3UNUSED ; CTestModuleIf::NewL(CTestThreadContainer *, CTestModuleBase *)
+	NewL__14CStifTFwIfProt @ 59 NONAME R3UNUSED ; CStifTFwIfProt::NewL(void)
+	NewL__15CStifItemParserG7TPtrC16ii @ 60 NONAME ; CStifItemParser::NewL(TPtrC16, int, int)
+	NewL__20CSTIFTestMeasurementP15CTestModuleBaseQ220CSTIFTestMeasurement20TSTIFMeasurementTypeRC7TDesC16 @ 61 NONAME R3UNUSED ; CSTIFTestMeasurement::NewL(CTestModuleBase *, CSTIFTestMeasurement::TSTIFMeasurementType, TDesC16 const &)
+	NewL__21CTestModuleParamVer01 @ 62 NONAME R3UNUSED ; CTestModuleParamVer01::NewL(void)
+	NewL__21MSTIFTestInterferenceP15CTestModuleBaseQ221MSTIFTestInterference29TStifTestInterferenceCategory @ 63 NONAME R3UNUSED ; MSTIFTestInterference::NewL(CTestModuleBase *, MSTIFTestInterference::TStifTestInterferenceCategory)
+	NextSectionL__11CStifParserRC7TDesC16T1i @ 64 NONAME ; CStifParser::NextSectionL(TDesC16 const &, TDesC16 const &, int)
+	NextSubSectionL__18CStifSectionParserRC7TDesC16T1i @ 65 NONAME ; CStifSectionParser::NextSubSectionL(TDesC16 const &, TDesC16 const &, int)
+	OutputType__11CStifLogger @ 66 NONAME R3UNUSED ; CStifLogger::OutputType(void)
+	ParsingType__15CStifItemParser @ 67 NONAME R3UNUSED ; CStifItemParser::ParsingType(void)
+	Printf__13CTestModuleIfiRC7TDesC16Gt11TRefByValue1ZC7TDesC16e @ 68 NONAME ; CTestModuleIf::Printf(int, TDesC16 const &, TRefByValue<TDesC16 const>,...)
+	Reboot__13CTestModuleIfi @ 69 NONAME R3UNUSED ; CTestModuleIf::Reboot(int)
+	Remainder__15CStifItemParserR7TPtrC16 @ 70 NONAME R3UNUSED ; CStifItemParser::Remainder(TPtrC16 &)
+	RemoteReceiveCancel__13CTestModuleIf @ 71 NONAME R3UNUSED ; CTestModuleIf::RemoteReceiveCancel(void)
+	RemoteReceive__13CTestModuleIfR6TDes16R14TRequestStatus @ 72 NONAME R3UNUSED ; CTestModuleIf::RemoteReceive(TDes16 &, TRequestStatus &)
+	RemoteSend__13CTestModuleIfRC7TDesC16 @ 73 NONAME R3UNUSED ; CTestModuleIf::RemoteSend(TDesC16 const &)
+	RemoteType__14CStifTFwIfProti @ 74 NONAME R3UNUSED ; CStifTFwIfProt::RemoteType(int)
+	ResetAllowResult__13CTestModuleIf @ 75 NONAME R3UNUSED ; CTestModuleIf::ResetAllowResult(void)
+	RespParam__14CStifTFwIfProti @ 76 NONAME R3UNUSED ; CStifTFwIfProt::RespParam(int)
+	ResultCategory__14CStifTFwIfProti @ 77 NONAME R3UNUSED ; CStifTFwIfProt::ResultCategory(int)
+	RunInternalL__11CScriptBasePC17TStifFunctionInfoiR15CStifItemParser @ 78 NONAME ; CScriptBase::RunInternalL(TStifFunctionInfo const *, int, CStifItemParser &)
+	RunParams__14CStifTFwIfProti @ 79 NONAME R3UNUSED ; CStifTFwIfProt::RunParams(int)
+	RunStatusParams__14CStifTFwIfProti @ 80 NONAME R3UNUSED ; CStifTFwIfProt::RunStatusParams(int)
+	RunStatus__14CStifTFwIfProti @ 81 NONAME R3UNUSED ; CStifTFwIfProt::RunStatus(int)
+	SaveData__11CStifLoggerR6TDesC8 @ 82 NONAME R3UNUSED ; CStifLogger::SaveData(TDesC8 &)
+	SaveData__11CStifLoggerR7TDesC16 @ 83 NONAME R3UNUSED ; CStifLogger::SaveData(TDesC16 &)
+	SectionL__11CStifParserRC7TDesC16T1i @ 84 NONAME ; CStifParser::SectionL(TDesC16 const &, TDesC16 const &, int)
+	SetAllowResult__13CTestModuleIfi @ 85 NONAME R3UNUSED ; CTestModuleIf::SetAllowResult(int)
+	SetBehavior__13CTestModuleIfQ213CTestModuleIf13TTestBehaviorPv @ 86 NONAME R3UNUSED ; CTestModuleIf::SetBehavior(CTestModuleIf::TTestBehavior, void *)
+	SetCmdType__14CStifTFwIfProtQ214CStifTFwIfProt8TCmdType @ 87 NONAME R3UNUSED ; CStifTFwIfProt::SetCmdType(CStifTFwIfProt::TCmdType)
+	SetDstId__14CStifTFwIfProtUl @ 88 NONAME R3UNUSED ; CStifTFwIfProt::SetDstId(unsigned long)
+	SetExitReason__13CTestModuleIfQ213CTestModuleIf11TExitReasoni @ 89 NONAME R3UNUSED ; CTestModuleIf::SetExitReason(CTestModuleIf::TExitReason, int)
+	SetL__14CStifTFwIfProtRC7TDesC16 @ 90 NONAME R3UNUSED ; CStifTFwIfProt::SetL(TDesC16 const &)
+	SetMsgType__14CStifTFwIfProtQ214CStifTFwIfProt8TMsgType @ 91 NONAME R3UNUSED ; CStifTFwIfProt::SetMsgType(CStifTFwIfProt::TMsgType)
+	SetParsingType__15CStifItemParserQ215CStifItemParser12TParsingType @ 92 NONAME R3UNUSED ; CStifItemParser::SetParsingType(CStifItemParser::TParsingType)
+	SetPosition__18CStifSectionParseri @ 93 NONAME R3UNUSED ; CStifSectionParser::SetPosition(int)
+	SetRespType__14CStifTFwIfProtQ214CStifTFwIfProt8TMsgType @ 94 NONAME R3UNUSED ; CStifTFwIfProt::SetRespType(CStifTFwIfProt::TMsgType)
+	SetResult__11TTestResultiRC7TDesC16 @ 95 NONAME R3UNUSED ; TTestResult::SetResult(int, TDesC16 const &)
+	SetScripter__11CScriptBasePFP13CTestScripter19TStifTSCallBackTypeRC7TDesC16_iP13CTestScripter @ 96 NONAME R3UNUSED ; CScriptBase::SetScripter(int (*)(CTestScripter *, TStifTSCallBackType, TDesC16 const &), CTestScripter *)
+	SetSrcId__14CStifTFwIfProtUl @ 97 NONAME R3UNUSED ; CStifTFwIfProt::SetSrcId(unsigned long)
+	Signal__11CScriptBasei @ 98 NONAME R3UNUSED ; CScriptBase::Signal(int)
+	SrcDevId__14CStifTFwIfProt @ 99 NONAME R3UNUSED ; CStifTFwIfProt::SrcDevId(void)
+	SrcId__14CStifTFwIfProt @ 100 NONAME R3UNUSED ; CStifTFwIfProt::SrcId(void)
+	SrcTestId__14CStifTFwIfProt @ 101 NONAME R3UNUSED ; CStifTFwIfProt::SrcTestId(void)
+	StartSession__Fv @ 102 NONAME R3UNUSED ; StartSession(void)
+	Start__20CSTIFTestMeasurement @ 103 NONAME R3UNUSED ; CSTIFTestMeasurement::Start(void)
+	StifMacroError__13CTestModuleIfiPCUcPCciiiiiii @ 104 NONAME ; CTestModuleIf::StifMacroError(int, unsigned char const *, char const *, int, int, int, int, int, int, int)
+	Stop__20CSTIFTestMeasurement @ 105 NONAME R3UNUSED ; CSTIFTestMeasurement::Stop(void)
+	StoreState__13CTestModuleIfiRt4TBuf1i128 @ 106 NONAME R3UNUSED ; CTestModuleIf::StoreState(int, TBuf<128> &)
+	SubSectionL__18CStifSectionParserRC7TDesC16T1i @ 107 NONAME ; CStifSectionParser::SubSectionL(TDesC16 const &, TDesC16 const &, int)
+	TestModuleIf__11CScriptBase @ 108 NONAME R3UNUSED ; CScriptBase::TestModuleIf(void)
+	WriteDelimiter__11CStifLoggerRC6TDesC8i @ 109 NONAME R3UNUSED ; CStifLogger::WriteDelimiter(TDesC8 const &, int)
+	WriteDelimiter__11CStifLoggerRC7TDesC16i @ 110 NONAME R3UNUSED ; CStifLogger::WriteDelimiter(TDesC16 const &, int)
+	"_._11CStifParser" @ 111 NONAME R3UNUSED ; CStifParser::~CStifParser(void)
+	"_._14CStifTFwIfProt" @ 112 NONAME R3UNUSED ; CStifTFwIfProt::~CStifTFwIfProt(void)
+	"_._21CTestModuleParamVer01" @ 113 NONAME R3UNUSED ; CTestModuleParamVer01::~CTestModuleParamVer01(void)
+	__11CScriptBaseR13CTestModuleIf @ 114 NONAME R3UNUSED ; CScriptBase::CScriptBase(CTestModuleIf &)
+	__11TTestResult @ 115 NONAME R3UNUSED ; TTestResult::TTestResult(void)
+	__13TTestCaseInfo @ 116 NONAME R3UNUSED ; TTestCaseInfo::TTestCaseInfo(void)
+	__13TTestProgress @ 117 NONAME R3UNUSED ; TTestProgress::TTestProgress(void)
+	__15TFullTestResult @ 118 NONAME R3UNUSED ; TFullTestResult::TFullTestResult(void)
+	__18TErrorNotification @ 119 NONAME R3UNUSED ; TErrorNotification::TErrorNotification(void)
+	AppendId__14CStifTFwIfProtUl @ 120 NONAME R3UNUSED ; CStifTFwIfProt::AppendId(unsigned long)
+




