
diff -r ae690a8c4a18 -r f7bf1ed8db72 mmlibs/mmfw/tsrc/mmfunittest/eabi/TS_CmmfVideoTestCustomCommandsU.DEF
--- a/mmlibs/mmfw/tsrc/mmfunittest/eabi/TS_CmmfVideoTestCustomCommandsU.DEF	Fri Jul 09 13:09:11 2010 +0100
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,11 +0,0 @@
-EXPORTS
-	_ZN22RMMFTestCustomCommands16MvcGetFrameRateLERf @ 1 NONAME
-	_ZN22RMMFTestCustomCommands16MvcSetFrameRateLEf @ 2 NONAME
-	_ZN22RMMFTestCustomCommandsC1ER14RMMFController4TUid @ 3 NONAME
-	_ZN22RMMFTestCustomCommandsC2ER14RMMFController4TUid @ 4 NONAME
-	_ZN27CMMFTestCustomCommandParser13HandleRequestER11TMMFMessage @ 5 NONAME
-	_ZN27CMMFTestCustomCommandParser4NewLE4TUidR32MMMFTestCustomCommandImplementor @ 6 NONAME
-	_ZN27CMMFTestCustomCommandParser5NewLCE4TUidR32MMMFTestCustomCommandImplementor @ 7 NONAME
-	_ZTI27CMMFTestCustomCommandParser @ 8 NONAME ; #<TI>#
-	_ZTV27CMMFTestCustomCommandParser @ 9 NONAME ; #<VT>#
-




