
diff -r c36d67f77f75 -r eb1e5d7cc688 mmlibs/mmfw/tsrc/mmfunittest/bwins/TS_CMMFTESTCUSTOMCOMMANDS.DEF
--- a/mmlibs/mmfw/tsrc/mmfunittest/bwins/TS_CMMFTESTCUSTOMCOMMANDS.DEF	Thu Jun 24 10:37:45 2010 +0100
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,8 +0,0 @@
-EXPORTS
-	??0RMMFTestCustomCommands@@QAE@AAVRMMFController@@VTUid@@@Z @ 1 NONAME ; public: __thiscall RMMFTestCustomCommands::RMMFTestCustomCommands(class RMMFController &,class TUid)
-	?GetAudioQuality@RMMFTestCustomCommands@@QAEHAAH@Z @ 2 NONAME ; public: int __thiscall RMMFTestCustomCommands::GetAudioQuality(int &)
-	?HandleRequest@CMMFTestCustomCommandParser@@UAEXAAVTMMFMessage@@@Z @ 3 NONAME ; public: virtual void __thiscall CMMFTestCustomCommandParser::HandleRequest(class TMMFMessage &)
-	?NewL@CMMFTestCustomCommandParser@@SAPAV1@AAVMMMFTestCustomCommandImplementor@@@Z @ 4 NONAME ; public: static class CMMFTestCustomCommandParser * __cdecl CMMFTestCustomCommandParser::NewL(class MMMFTestCustomCommandImplementor &)
-	?NewLC@CMMFTestCustomCommandParser@@SAPAV1@AAVMMMFTestCustomCommandImplementor@@@Z @ 5 NONAME ; public: static class CMMFTestCustomCommandParser * __cdecl CMMFTestCustomCommandParser::NewLC(class MMMFTestCustomCommandImplementor &)
-	?SetAudioQuality@RMMFTestCustomCommands@@QAEHH@Z @ 6 NONAME ; public: int __thiscall RMMFTestCustomCommands::SetAudioQuality(int)
-




