EXPORTS
	_ZN10RLbsNetSim15ReleaseLcsMoLrLEi @ 1 NONAME
	_ZN10RLbsNetSim16RegisterLcsMoLrLERK7TDesC16 @ 2 NONAME
	_ZN10RLbsNetSim26MeasurementControlFailureLEi @ 3 NONAME
	_ZN10RLbsNetSim26MeasurementReportLocationLERK17TPositionInfoBase @ 4 NONAME
	_ZN10RLbsNetSim31ReleaseLcsLocationNotificationLERKN23CLbsNetworkProtocolBase19TLbsPrivacyResponseE @ 5 NONAME
	_ZN10RLbsNetSim51MeasurementReportLocationRequestMoreAssistanceDataLERKm @ 6 NONAME
	_ZN10RLbsNetSim5CloseEv @ 7 NONAME
	_ZN10RLbsNetSim8ConnectLEP18MLbsNetSimObserver @ 8 NONAME
	_ZN10RLbsNetSimC1Ev @ 9 NONAME
	_ZN10RLbsNetSimC2Ev @ 10 NONAME
	_ZN10RLbsNetSimD1Ev @ 11 NONAME
	_ZN10RLbsNetSimD2Ev @ 12 NONAME
	_ZN14RLbsNetSimTest10SetQualityER24TLbsNetPosRequestQuality @ 13 NONAME
	_ZN14RLbsNetSimTest11SetStepModeEi @ 14 NONAME
	_ZN14RLbsNetSimTest15SetResponseTimeEli @ 15 NONAME
	_ZN14RLbsNetSimTest16SetResponseErrorEli @ 16 NONAME
	_ZN14RLbsNetSimTest16SetRoamingStatusEi @ 17 NONAME
	_ZN14RLbsNetSimTest17SetEmergenyStatusEi @ 18 NONAME
	_ZN14RLbsNetSimTest20SetReferenceLocationER6TDesC8 @ 19 NONAME
	_ZN14RLbsNetSimTest20SetReferenceLocationER9TPosition @ 20 NONAME
	_ZN14RLbsNetSimTest25SetAssistanceDataProviderE4TUid @ 21 NONAME
	_ZN14RLbsNetSimTest26ClearAssistanceDataFiltersEv @ 22 NONAME
	_ZN14RLbsNetSimTest26SetMoreAssitanceDataFilterERm @ 23 NONAME
	_ZN14RLbsNetSimTest26StartNetworkPrivacyRequestE24TLbsNetPosRequestPrivacyR23TLbsExternalRequestInfo @ 24 NONAME
	_ZN14RLbsNetSimTest27CancelNetworkPrivacyRequestEv @ 25 NONAME
	_ZN14RLbsNetSimTest27StartNetworkLocationRequestEv @ 26 NONAME
	_ZN14RLbsNetSimTest28CancelNetworkLocationRequestEv @ 27 NONAME
	_ZN14RLbsNetSimTest29SetDefaultAssitanceDataFilterERm @ 28 NONAME
	_ZN14RLbsNetSimTest4NextEi @ 29 NONAME
	_ZN14RLbsNetSimTest5CloseEv @ 30 NONAME
	_ZN14RLbsNetSimTest8ConnectLEP22MLbsNetSimTestObserver @ 31 NONAME
	_ZN14RLbsNetSimTestC1Ev @ 32 NONAME
	_ZN14RLbsNetSimTestC2Ev @ 33 NONAME
	_ZN14RLbsNetSimTestD1Ev @ 34 NONAME
	_ZN14RLbsNetSimTestD2Ev @ 35 NONAME
	_ZTIN10RLbsNetSim26CMeasurementReportLocationE @ 36 NONAME ; #<TI>#
	_ZTIN10RLbsNetSim32CNotificationRegisterLcsLocationE @ 37 NONAME ; #<TI>#
	_ZTIN10RLbsNetSim39CNotificationMeasurementControlLocationE @ 38 NONAME ; #<TI>#
	_ZTIN14RLbsNetSimTest20CNotificationConnectE @ 39 NONAME ; #<TI>#
	_ZTIN14RLbsNetSimTest23CNotificationDisconnectE @ 40 NONAME ; #<TI>#
	_ZTIN14RLbsNetSimTest27CNotificationReleaseLcsMoLrE @ 41 NONAME ; #<TI>#
	_ZTIN14RLbsNetSimTest28CNotificationRegisterLcsMoLrE @ 42 NONAME ; #<TI>#
	_ZTIN14RLbsNetSimTest30CNotificationMeasurementReportE @ 43 NONAME ; #<TI>#
	_ZTIN14RLbsNetSimTest34CNotificationFacilityLcsMoLrResultE @ 44 NONAME ; #<TI>#
	_ZTIN14RLbsNetSimTest35CMessageStartNetworkLocationRequestE @ 45 NONAME ; #<TI>#
	_ZTIN14RLbsNetSimTest38CMessageReleaseLcsLocationNotificationE @ 46 NONAME ; #<TI>#
	_ZTIN14RLbsNetSimTest39CNotificationMeasurementControlLocationE @ 47 NONAME ; #<TI>#
	_ZTIN14RLbsNetSimTest44CNotificationMeasurementReportControlFailureE @ 48 NONAME ; #<TI>#
	_ZTIN14RLbsNetSimTest54CNotificationMeasurementReportRequestMoreAssitanceDataE @ 49 NONAME ; #<TI>#
	_ZTVN10RLbsNetSim26CMeasurementReportLocationE @ 50 NONAME ; #<VT>#
	_ZTVN10RLbsNetSim32CNotificationRegisterLcsLocationE @ 51 NONAME ; #<VT>#
	_ZTVN10RLbsNetSim39CNotificationMeasurementControlLocationE @ 52 NONAME ; #<VT>#
	_ZTVN14RLbsNetSimTest20CNotificationConnectE @ 53 NONAME ; #<VT>#
	_ZTVN14RLbsNetSimTest23CNotificationDisconnectE @ 54 NONAME ; #<VT>#
	_ZTVN14RLbsNetSimTest27CNotificationReleaseLcsMoLrE @ 55 NONAME ; #<VT>#
	_ZTVN14RLbsNetSimTest28CNotificationRegisterLcsMoLrE @ 56 NONAME ; #<VT>#
	_ZTVN14RLbsNetSimTest30CNotificationMeasurementReportE @ 57 NONAME ; #<VT>#
	_ZTVN14RLbsNetSimTest34CNotificationFacilityLcsMoLrResultE @ 58 NONAME ; #<VT>#
	_ZTVN14RLbsNetSimTest35CMessageStartNetworkLocationRequestE @ 59 NONAME ; #<VT>#
	_ZTVN14RLbsNetSimTest38CMessageReleaseLcsLocationNotificationE @ 60 NONAME ; #<VT>#
	_ZTVN14RLbsNetSimTest39CNotificationMeasurementControlLocationE @ 61 NONAME ; #<VT>#
	_ZTVN14RLbsNetSimTest44CNotificationMeasurementReportControlFailureE @ 62 NONAME ; #<VT>#
	_ZTVN14RLbsNetSimTest54CNotificationMeasurementReportRequestMoreAssitanceDataE @ 63 NONAME ; #<VT>#
	_ZTIN10RLbsNetSim33CNotificationCancelPrivacyRequestE @ 64 NONAME ; #<TI>#
	_ZTVN10RLbsNetSim33CNotificationCancelPrivacyRequestE @ 65 NONAME ; #<VT>#
	_ZTIN10RLbsNetSim24CNotificationNetworkGoneE @ 66 NONAME ; #<TI>#
	_ZTVN10RLbsNetSim24CNotificationNetworkGoneE @ 67 NONAME ; #<VT>#
	_ZN14RLbsNetSimTest23SendResetAssistanceDataEm @ 68 NONAME
	_ZTIN10RLbsNetSim32CNotificationResetAssistanceDataE @ 69 NONAME
	_ZTVN10RLbsNetSim32CNotificationResetAssistanceDataE @ 70 NONAME

