
diff -r bdd4df282e3e -r 2965a06983dc lbstest/lbstestproduct/hybridprotocolmodule/eabi/GetafixUtilsu.def
--- a/lbstest/lbstestproduct/hybridprotocolmodule/eabi/GetafixUtilsu.def	Fri Apr 16 16:28:16 2010 +0300
+++ b/lbstest/lbstestproduct/hybridprotocolmodule/eabi/GetafixUtilsu.def	Mon May 03 13:50:32 2010 +0300
@@ -116,4 +116,7 @@
 	_ZTV25CTLbsX3pTransmitLocWaiter @ 115 NONAME
 	_ZTVN13CPropPipeBase20CPropPipeBaseTimeOutE @ 116 NONAME
 	_ZTVN13CPropPipeBase20CPropPipeBaseWatcherE @ 117 NONAME
+	_ZN19CNotifyReadPropPipeD0Ev @ 118 NONAME
+	_ZN19CNotifyReadPropPipeD1Ev @ 119 NONAME
+	_ZN19CNotifyReadPropPipeD2Ev @ 120 NONAME
 




