
diff -r 41f0cfe18c80 -r c734af59ce98 kernel/eka/eabi/ekernsmp.def
--- a/kernel/eka/eabi/ekernsmp.def	Tue Apr 27 18:02:57 2010 +0300
+++ b/kernel/eka/eabi/ekernsmp.def	Tue May 11 17:28:22 2010 +0300
@@ -1180,4 +1180,13 @@
 	_ZN4Kern10RandomSaltEyj @ 1179 NONAME
 	_ZN4Kern10RandomSaltEPKhjj @ 1180 NONAME
 	_ZN4Kern12SecureRandomER5TDes8 @ 1181 NONAME
+	_ZN13DPagingDevice16NotificationLockEv @ 1182 NONAME
+	_ZN13KernCoreStats5StatsEPv @ 1183 NONAME ABSENT
+	_ZN13KernCoreStats6EngageEi @ 1184 NONAME ABSENT
+	_ZN13KernCoreStats6RetireEii @ 1185 NONAME ABSENT
+	_ZN13KernCoreStats9ConfigureEj @ 1186 NONAME ABSENT
+	_ZN5NKern21SetNumberOfActiveCpusEi @ 1187 NONAME ABSENT
+	_ZN3Arm14SetIdleHandlerEPFvPvmPVvES0_ @ 1188 NONAME ABSENT
+	_ZN4Epoc11FreeRamZoneEj @ 1189 NONAME ABSENT
+	_ZN16TBitMapAllocator14SelectiveAllocEii @ 1190 NONAME
 




