
diff -r 95f71bcdcdb7 -r 657f875b013e kernel/eka/bx86/ekernsmp.def
--- a/kernel/eka/bx86/ekernsmp.def	Thu May 27 14:17:14 2010 +0300
+++ b/kernel/eka/bx86/ekernsmp.def	Fri Jun 11 15:02:23 2010 +0300
@@ -1011,4 +1011,5 @@
 	?Stats@KernCoreStats@@SAHPAX@Z @ 1010 NONAME	;  public: static int KernCoreStats::Stats(void *)
 	?SetNumberOfActiveCpus@NKern@@SAXH@Z @ 1011 NONAME ; public: static void __cdecl NKern::SetNumberOfActiveCpus(int)
 	?FreeRamZone@Epoc@@SAHI@Z @ 1012 NONAME ; public: static int Epoc::FreeRamZone(unsigned int)
+	?SelectiveAlloc@TBitMapAllocator@@QAEIHH@Z @ 1013 NONAME ; public: unsigned int __thiscall TBitMapAllocator::SelectiveAlloc(int,int)
 




