
diff -r bf7481649c98 -r 7f25ef56562d graphicscomposition/openwfcinterface/eabi/libWFCu.def
--- a/graphicscomposition/openwfcinterface/eabi/libWFCu.def	Fri Jun 11 14:58:47 2010 +0300
+++ b/graphicscomposition/openwfcinterface/eabi/libWFCu.def	Wed Jun 23 19:41:15 2010 +0300
@@ -26,7 +26,7 @@
 	wfcGetElementAttribiv @ 25 NONAME
 	wfcGetElementBelow @ 26 NONAME
 	wfcGetError @ 27 NONAME
-	wfcGetOnScreenStream @ 28 NONAME
+	extwfcGetOnScreenStream @ 28 NONAME
 	wfcGetStrings @ 29 NONAME
 	wfcInsertElement @ 30 NONAME
 	wfcIsExtensionSupported @ 31 NONAME




