
diff -r d72fc2aace31 -r 62bb7c97884c graphicstest/graphicstestharness/eabi/tgraphicsfontutilsu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/graphicstest/graphicstestharness/eabi/tgraphicsfontutilsu.def	Fri Jul 30 11:41:40 2010 +0300
@@ -0,0 +1,11 @@
+EXPORTS
+	_ZN18CCharCodeConverter4NewLEv @ 1 NONAME
+	_ZN18CCharCodeConverter8UseFontLEP8CFbsFont @ 2 NONAME
+	_ZN18CCharCodeConverterD0Ev @ 3 NONAME
+	_ZN18CCharCodeConverterD1Ev @ 4 NONAME
+	_ZN18CCharCodeConverterD2Ev @ 5 NONAME
+	_ZNK18CCharCodeConverter10GlyphCodeLEi @ 6 NONAME
+	_ZTI18CCharCodeConverter @ 7 NONAME
+	_ZTV18CCharCodeConverter @ 8 NONAME
+	_ZN18CCharCodeConverter5NewLCEv @ 9 NONAME
+




