EXPORTS
	_ZN12TBtraceUtils23FastTicksToMicroSecondsERKy @ 1 NONAME
	_ZN12TBtraceUtils23MicroSecondsToFastTicksE27TTimeIntervalMicroSeconds32 @ 2 NONAME
	_ZN12TBtraceUtils23MicroSecondsToNanoTicksE27TTimeIntervalMicroSeconds32 @ 3 NONAME
	_ZN12TBtraceUtils23NanoTicksToMicroSecondsEm @ 4 NONAME
	_ZN12TBtraceUtils26DebugOverrideTimerSettingsEiii @ 5 NONAME
	_ZN13CBtracePubSub22NotifyPropertyChangedLEPjS0_R21MBtracePubSubObserver30TBtraceNotificationPersistence @ 6 NONAME
	_ZN13CBtracePubSub22NotifyPropertyChangedLER21MBtracePubSubObserver @ 7 NONAME
	_ZN13CBtracePubSub26NotifyDataPropertyChangedLEPjS0_PK6TDesC8R21MBtracePubSubObserver30TBtraceNotificationPersistence @ 8 NONAME
	_ZN13CBtracePubSub27CancelNotifyPropertyChangedER21MBtracePubSubObserver @ 9 NONAME
	_ZN13CBtracePubSub29NotifyIntegerPropertyChangedLEPjS0_PiR21MBtracePubSubObserver30TBtraceNotificationPersistence @ 10 NONAME
	_ZN13CBtracePubSub4NewLER13CBtraceReader @ 11 NONAME
	_ZN13CBtracePubSubD0Ev @ 12 NONAME
	_ZN13CBtracePubSubD1Ev @ 13 NONAME
	_ZN13CBtracePubSubD2Ev @ 14 NONAME
	_ZN13CBtraceReader12AddObserverLER15MBtraceObserver @ 15 NONAME
	_ZN13CBtraceReader12AddObserverLER15MBtraceObserverNS_13TObserverTypeE @ 16 NONAME
	_ZN13CBtraceReader12AddObserverLEjR15MBtraceObserver @ 17 NONAME
	_ZN13CBtraceReader12AddObserverLEjR15MBtraceObserverNS_13TObserverTypeE @ 18 NONAME
	_ZN13CBtraceReader12SynchronizeLEv @ 19 NONAME
	_ZN13CBtraceReader13DisableBtraceEv @ 20 NONAME
	_ZN13CBtraceReader14RemoveObserverER15MBtraceObserver @ 21 NONAME
	_ZN13CBtraceReader14RemoveObserverEjR15MBtraceObserver @ 22 NONAME
	_ZN13CBtraceReader14SetBufferSizeLEi @ 23 NONAME
	_ZN13CBtraceReader15EnableCategoryLEj @ 24 NONAME
	_ZN13CBtraceReader15LogBtraceStatusEv @ 25 NONAME
	_ZN13CBtraceReader16AddFrameObseverLER20MBtraceFrameObserver @ 26 NONAME
	_ZN13CBtraceReader16DisableCategoryLEj @ 27 NONAME
	_ZN13CBtraceReader18SetReplayFileNameLERK7TDesC16 @ 28 NONAME
	_ZN13CBtraceReader19RemoveFrameObserverER20MBtraceFrameObserver @ 29 NONAME
	_ZN13CBtraceReader23RecordBtraceDataToFileLERK7TDesC16 @ 30 NONAME
	_ZN13CBtraceReader23SetMultipartReassemblyLEi @ 31 NONAME
	_ZN13CBtraceReader24GetReplayStartTickCountLER16TBtraceTickCount @ 32 NONAME
	_ZN13CBtraceReader4NewLENS_5TModeEiiP10MBtraceLog @ 33 NONAME
	_ZN13CBtraceReader4NewLERK7TDesC16P10MBtraceLog @ 34 NONAME
	_ZN13CBtraceReader5ResetEv @ 35 NONAME
	_ZN13CBtraceReader5StartERK16TBtraceTickCount @ 36 NONAME
	_ZN13CBtraceReader6FlushLEv @ 37 NONAME
	_ZN13CBtraceReaderD0Ev @ 38 NONAME
	_ZN13CBtraceReaderD1Ev @ 39 NONAME
	_ZN13CBtraceReaderD2Ev @ 40 NONAME
	_ZN13TBtraceIdBase3SetEj @ 41 NONAME
	_ZN13TBtraceIdBaseC1ERKS_ @ 42 NONAME
	_ZN13TBtraceIdBaseC1Ej @ 43 NONAME
	_ZN13TBtraceIdBaseC1Ev @ 44 NONAME
	_ZN13TBtraceIdBaseC2ERKS_ @ 45 NONAME
	_ZN13TBtraceIdBaseC2Ej @ 46 NONAME
	_ZN13TBtraceIdBaseC2Ev @ 47 NONAME
	_ZN14CBtraceContext17NotifyThreadExitLERK7TDesC16jPiPS1_R22MBtraceContextObserverj30TBtraceNotificationPersistence @ 48 NONAME
	_ZN14CBtraceContext17NotifyThreadGoneLERK7TDesC16R22MBtraceContextObserverj @ 49 NONAME
	_ZN14CBtraceContext17NotifyThreadGoneLERK7TDesC16R22MBtraceContextObserverj30TBtraceNotificationPersistence @ 50 NONAME
	_ZN14CBtraceContext17NotifyThreadSeenLERK7TDesC16R22MBtraceContextObserverj @ 51 NONAME
	_ZN14CBtraceContext17NotifyThreadSeenLERK7TDesC16R22MBtraceContextObserverj30TBtraceNotificationPersistence @ 52 NONAME
	_ZN14CBtraceContext22CancelNotifyThreadExitER22MBtraceContextObserver @ 53 NONAME
	_ZN14CBtraceContext22CancelNotifyThreadGoneER22MBtraceContextObserver @ 54 NONAME
	_ZN14CBtraceContext22CancelNotifyThreadSeenER22MBtraceContextObserver @ 55 NONAME
	_ZN14CBtraceContext22NotifyWindowGroupSeenLERK7TDesC16R22MBtraceContextObserverj30TBtraceNotificationPersistence @ 56 NONAME
	_ZN14CBtraceContext27CancelNotifyWindowGroupSeenER22MBtraceContextObserver @ 57 NONAME
	_ZN14CBtraceContext34NotifyWindowGroupSeenByThreadNameLERK7TDesC16R22MBtraceContextObserverj30TBtraceNotificationPersistence @ 58 NONAME
	_ZN14CBtraceContext4NewLER13CBtraceReaderNS_5TModeE @ 59 NONAME
	_ZN14CBtraceContextD0Ev @ 60 NONAME
	_ZN14CBtraceContextD1Ev @ 61 NONAME
	_ZN14CBtraceContextD2Ev @ 62 NONAME
	_ZN14CBtraceGeneric19NotifyGenericEventLER22MBtraceGenericObserver @ 63 NONAME
	_ZN14CBtraceGeneric4NewLER13CBtraceReader @ 64 NONAME
	_ZN14CBtraceGenericD0Ev @ 65 NONAME
	_ZN14CBtraceGenericD1Ev @ 66 NONAME
	_ZN14CBtraceGenericD2Ev @ 67 NONAME
	_ZN15CBtraceCpuUsage15NotifyCpuUsageLEm27TTimeIntervalMicroSeconds32R23MBtraceCpuUsageObserver @ 68 NONAME
	_ZN15CBtraceCpuUsage15NotifyCpuUsageLEm27TTimeIntervalMicroSeconds32R23MBtraceCpuUsageObserver30TBtraceNotificationPersistence @ 69 NONAME
	_ZN15CBtraceCpuUsage17NotifyThreadIdleLERK15TBtraceThreadIdRK16TBtraceTickCount27TTimeIntervalMicroSeconds32R23MBtraceCpuUsageObserver @ 70 NONAME
	_ZN15CBtraceCpuUsage17NotifyThreadIdleLERK15TBtraceThreadIdRK16TBtraceTickCount27TTimeIntervalMicroSeconds32R23MBtraceCpuUsageObserver30TBtraceNotificationPersistence @ 71 NONAME
	_ZN15CBtraceCpuUsage20NotifyContextSwitchLERK15TBtraceThreadIdR23MBtraceCpuUsageObserver @ 72 NONAME
	_ZN15CBtraceCpuUsage22CancelNotifyThreadIdleER23MBtraceCpuUsageObserver @ 73 NONAME
	_ZN15CBtraceCpuUsage4NewLER13CBtraceReaderR14CBtraceContext @ 74 NONAME
	_ZN15CBtraceCpuUsageD0Ev @ 75 NONAME
	_ZN15CBtraceCpuUsageD1Ev @ 76 NONAME
	_ZN15CBtraceCpuUsageD2Ev @ 77 NONAME
	_ZN15CBtraceKeyPress15NotifyKeyEventLER23MBtraceKeyPressObserver @ 78 NONAME
	_ZN15CBtraceKeyPress15NotifyKeyEventLER23MBtraceKeyPressObserver30TBtraceNotificationPersistence @ 79 NONAME
	_ZN15CBtraceKeyPress18NotifyRawKeyEventLER23MBtraceKeyPressObserver @ 80 NONAME
	_ZN15CBtraceKeyPress18NotifyRawKeyEventLER23MBtraceKeyPressObserver30TBtraceNotificationPersistence @ 81 NONAME
	_ZN15CBtraceKeyPress19NotifyPointerEventLER23MBtraceKeyPressObserver @ 82 NONAME
	_ZN15CBtraceKeyPress19NotifyPointerEventLER23MBtraceKeyPressObserver30TBtraceNotificationPersistence @ 83 NONAME
	_ZN15CBtraceKeyPress20CancelNotifyKeyEventER23MBtraceKeyPressObserver @ 84 NONAME
	_ZN15CBtraceKeyPress23CancelNotifyRawKeyEventER23MBtraceKeyPressObserver @ 85 NONAME
	_ZN15CBtraceKeyPress23NotifyUnclassifiedDataLER23MBtraceKeyPressObserver @ 86 NONAME
	_ZN15CBtraceKeyPress23NotifyUnclassifiedDataLER23MBtraceKeyPressObserver30TBtraceNotificationPersistence @ 87 NONAME
	_ZN15CBtraceKeyPress24CancelNotifyPointerEventER23MBtraceKeyPressObserver @ 88 NONAME
	_ZN15CBtraceKeyPress28CancelNotifyUnclassifiedDataER23MBtraceKeyPressObserver @ 89 NONAME
	_ZN15CBtraceKeyPress4NewLER13CBtraceReader @ 90 NONAME
	_ZN15CBtraceKeyPressD0Ev @ 91 NONAME
	_ZN15CBtraceKeyPressD1Ev @ 92 NONAME
	_ZN15CBtraceKeyPressD2Ev @ 93 NONAME
	_ZN15TBtraceThreadIdC1ERKS_ @ 94 NONAME
	_ZN15TBtraceThreadIdC1Ej @ 95 NONAME
	_ZN15TBtraceThreadIdC1Ev @ 96 NONAME
	_ZN15TBtraceThreadIdC2ERKS_ @ 97 NONAME
	_ZN15TBtraceThreadIdC2Ej @ 98 NONAME
	_ZN15TBtraceThreadIdC2Ev @ 99 NONAME
	_ZN16TBtraceProcessIdC1ERKS_ @ 100 NONAME
	_ZN16TBtraceProcessIdC1Ej @ 101 NONAME
	_ZN16TBtraceProcessIdC1Ev @ 102 NONAME
	_ZN16TBtraceProcessIdC2ERKS_ @ 103 NONAME
	_ZN16TBtraceProcessIdC2Ej @ 104 NONAME
	_ZN16TBtraceProcessIdC2Ev @ 105 NONAME
	_ZN16TBtraceTickCount8SetToNowEv @ 106 NONAME
	_ZN16TBtraceTickCountC1Ev @ 107 NONAME
	_ZN16TBtraceTickCountC2Ev @ 108 NONAME
	_ZN17CRefCountedObject6DecRefEv @ 109 NONAME
	_ZN17CRefCountedObject6IncRefEv @ 110 NONAME
	_ZN18CBtraceAppResponse18NotifyAppResponseLER26MBtraceAppResponseObserverRK10TProcessId @ 111 NONAME
	_ZN18CBtraceAppResponse18NotifyAppResponseLER26MBtraceAppResponseObserverRK10TProcessId30TBtraceNotificationPersistence @ 112 NONAME
	_ZN18CBtraceAppResponse23CancelNotifyAppResponseER26MBtraceAppResponseObserver @ 113 NONAME
	_ZN18CBtraceAppResponse4NewLER13CBtraceReader @ 114 NONAME
	_ZN18CBtraceAppResponseD0Ev @ 115 NONAME
	_ZN18CBtraceAppResponseD1Ev @ 116 NONAME
	_ZN18CBtraceAppResponseD2Ev @ 117 NONAME
	_ZN18CBtraceDomainEvent18NotifyDomainEventLEjR26MBtraceDomainEventObserver30TBtraceNotificationPersistence @ 118 NONAME
	_ZN18CBtraceDomainEvent18NotifyDomainEventLEjjR26MBtraceDomainEventObserver30TBtraceNotificationPersistence @ 119 NONAME
	_ZN18CBtraceDomainEvent18NotifyDomainEventLEjjjR26MBtraceDomainEventObserver30TBtraceNotificationPersistence @ 120 NONAME
	_ZN18CBtraceDomainEvent18NotifyDomainEventLEjjjjR26MBtraceDomainEventObserver30TBtraceNotificationPersistence @ 121 NONAME
	_ZN18CBtraceDomainEvent23CancelNotifyDomainEventER26MBtraceDomainEventObserver @ 122 NONAME
	_ZN18CBtraceDomainEvent4NewLER13CBtraceReader @ 123 NONAME
	_ZN18CBtraceDomainEventD0Ev @ 124 NONAME
	_ZN18CBtraceDomainEventD1Ev @ 125 NONAME
	_ZN18CBtraceDomainEventD2Ev @ 126 NONAME
	_ZN18CBtraceFocusChange19NotifyFocusChangedLERK7TDesC16R26MBtraceFocusChangeObserver @ 127 NONAME
	_ZN18CBtraceFocusChange19NotifyFocusChangedLERK7TDesC16R26MBtraceFocusChangeObserver30TBtraceNotificationPersistence @ 128 NONAME
	_ZN18CBtraceFocusChange24CancelNotifyFocusChangedER26MBtraceFocusChangeObserver @ 129 NONAME
	_ZN18CBtraceFocusChange4NewLER13CBtraceReaderR14CBtraceContext @ 130 NONAME
	_ZN18CBtraceFocusChangeD0Ev @ 131 NONAME
	_ZN18CBtraceFocusChangeD1Ev @ 132 NONAME
	_ZN18CBtraceFocusChangeD2Ev @ 133 NONAME
	_ZN19CBtraceScreenUpdate19NotifyScreenUpdateLER27MBtraceScreenUpdateObserver @ 134 NONAME
	_ZN19CBtraceScreenUpdate19NotifyScreenUpdateLER27MBtraceScreenUpdateObserver30TBtraceNotificationPersistence @ 135 NONAME
	_ZN19CBtraceScreenUpdate19NotifyScreenUpdateLEiRK5TRectR27MBtraceScreenUpdateObserver @ 136 NONAME
	_ZN19CBtraceScreenUpdate19NotifyScreenUpdateLEiRK5TRectR27MBtraceScreenUpdateObserver30TBtraceNotificationPersistence @ 137 NONAME
	_ZN19CBtraceScreenUpdate24CancelNotifyScreenUpdateER27MBtraceScreenUpdateObserver @ 138 NONAME
	_ZN19CBtraceScreenUpdate4NewLER13CBtraceReader @ 139 NONAME
	_ZN19CBtraceScreenUpdateD0Ev @ 140 NONAME
	_ZN19CBtraceScreenUpdateD1Ev @ 141 NONAME
	_ZN19CBtraceScreenUpdateD2Ev @ 142 NONAME
	_ZN19CBtraceTextOnScreen19NotifyTextOnScreenLERK7TDesC16NS_10TMatchModeER27MBtraceTextOnScreenObserver30TBtraceNotificationPersistence @ 143 NONAME
	_ZN19CBtraceTextOnScreen19NotifyTextOnScreenLERK7TDesC16R27MBtraceTextOnScreenObserver @ 144 NONAME
	_ZN19CBtraceTextOnScreen19NotifyTextOnScreenLERK7TDesC16R27MBtraceTextOnScreenObserver30TBtraceNotificationPersistence @ 145 NONAME
	_ZN19CBtraceTextOnScreen19NotifyTextOnScreenLERK7TDesC16iNS_10TMatchModeER27MBtraceTextOnScreenObserver @ 146 NONAME
	_ZN19CBtraceTextOnScreen19NotifyTextOnScreenLERK7TDesC16iNS_10TMatchModeER27MBtraceTextOnScreenObserver30TBtraceNotificationPersistence @ 147 NONAME
	_ZN19CBtraceTextOnScreen24CancelNotifyTextOnScreenER27MBtraceTextOnScreenObserver @ 148 NONAME
	_ZN19CBtraceTextOnScreen4NewLER13CBtraceReader @ 149 NONAME
	_ZN19CBtraceTextOnScreenD0Ev @ 150 NONAME
	_ZN19CBtraceTextOnScreenD1Ev @ 151 NONAME
	_ZN19CBtraceTextOnScreenD2Ev @ 152 NONAME
	_ZN20TBtraceWindowGroupIdC1ERKS_ @ 153 NONAME
	_ZN20TBtraceWindowGroupIdC1Ej @ 154 NONAME
	_ZN20TBtraceWindowGroupIdC1Ev @ 155 NONAME
	_ZN20TBtraceWindowGroupIdC2ERKS_ @ 156 NONAME
	_ZN20TBtraceWindowGroupIdC2Ej @ 157 NONAME
	_ZN20TBtraceWindowGroupIdC2Ev @ 158 NONAME
	_ZN22MBtraceContextObserver17HandleThreadExitLERK16TBtraceTickCountRK15TBtraceThreadId9TExitTypeiRK7TDesC16j @ 159 NONAME
	_ZN22MBtraceContextObserver17HandleThreadGoneLERK16TBtraceTickCountRK15TBtraceThreadIdj @ 160 NONAME
	_ZN22MBtraceContextObserver17HandleThreadSeenLERK16TBtraceTickCountRK15TBtraceThreadIdj @ 161 NONAME
	_ZN22MBtraceContextObserver22HandleWindowGroupSeenLERK16TBtraceTickCountRK20TBtraceWindowGroupIdj @ 162 NONAME
	_ZNK13CBtraceReader16CurrentTickCountEv @ 163 NONAME
	_ZNK13TBtraceIdBase5ValueEv @ 164 NONAME
	_ZNK13TBtraceIdBaseeqERKS_ @ 165 NONAME
	_ZNK14CBtraceContext10FindThreadERK9TThreadId @ 166 NONAME
	_ZNK14CBtraceContext10FindThreadEm @ 167 NONAME
	_ZNK14CBtraceContext10ThreadNameERK15TBtraceThreadId @ 168 NONAME
	_ZNK14CBtraceContext11ProcessNameERK16TBtraceProcessId @ 169 NONAME
	_ZNK14CBtraceContext12FindThreadsLERK7TDesC16R6RArrayI15TBtraceThreadIdE @ 170 NONAME
	_ZNK14CBtraceContext13WindowGroupIdERK20TBtraceWindowGroupId @ 171 NONAME
	_ZNK14CBtraceContext15FindWindowGroupEi @ 172 NONAME
	_ZNK14CBtraceContext15WindowGroupNameERK20TBtraceWindowGroupId @ 173 NONAME
	_ZNK14CBtraceContext17FindWindowGroupsLERK7TDesC16R6RArrayI20TBtraceWindowGroupIdE @ 174 NONAME
	_ZNK14CBtraceContext17GetFullThreadNameERK15TBtraceThreadIdR6TDes16 @ 175 NONAME
	_ZNK14CBtraceContext28FindWindowGroupsByThreadNameERK7TDesC16R6RArrayI20TBtraceWindowGroupIdE @ 176 NONAME
	_ZNK14CBtraceContext8ThreadIdERK15TBtraceThreadId @ 177 NONAME
	_ZNK16TBtraceTickCount19IntervalInFastTicksERKS_ @ 178 NONAME
	_ZNK16TBtraceTickCount19IntervalInNanoTicksERKS_ @ 179 NONAME
	_ZNK16TBtraceTickCount22IntervalInMicroSecondsERKS_ @ 180 NONAME
	_ZNK16TBtraceTickCounteqERKS_ @ 181 NONAME
	_ZNK16TBtraceTickCountgeERKS_ @ 182 NONAME
	_ZNK16TBtraceTickCountgtERKS_ @ 183 NONAME
	_ZNK16TBtraceTickCountleERKS_ @ 184 NONAME
	_ZNK16TBtraceTickCountltERKS_ @ 185 NONAME
	_ZNK16TBtraceTickCountneERKS_ @ 186 NONAME
	_ZNK17CRefCountedObject8RefCountEv @ 187 NONAME
	_ZTI22MBtraceContextObserver @ 188 NONAME
	_ZTV22MBtraceContextObserver @ 189 NONAME
	_ZN13CBtraceReader5StartERK16TBtraceTickCount27TTimeIntervalMicroSeconds32 @ 190 NONAME

