
diff -r 000000000000 -r 83f4b4db085c toolsandutils/autotest/eabi/autotestU.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/toolsandutils/autotest/eabi/autotestU.def	Tue Feb 02 01:39:43 2010 +0200
@@ -0,0 +1,14 @@
+EXPORTS
+	_ZN9CAutoTest11SetCompInfoERK6TDesC8 @ 1 NONAME
+	_ZN9CAutoTest15TestCheckPointLEiPci @ 2 NONAME
+	_ZN9CAutoTest19TestCheckPointCodeLEiPci @ 3 NONAME
+	_ZN9CAutoTest22TestCheckPointCompareLEiiRK7TDesC16Pci @ 4 NONAME
+	_ZN9CAutoTest4NewLEPK13TAutoTestCaseiRK7TDesC16R5RTest @ 5 NONAME
+	_ZN9CAutoTest6PrintfE11TRefByValueIK7TDesC16Ez @ 6 NONAME
+	_ZN9CAutoTest8ExecuteLEv @ 7 NONAME
+	_ZN9CAutoTest8LogExtraEPKhi11TRefByValueIK7TDesC16Ez @ 8 NONAME
+	_ZN9CAutoTest9KeepGoingEv @ 9 NONAME
+	_ZNK9CAutoTest9GetStringER12CConsoleBaseR6TDes16 @ 10 NONAME
+	_ZTI9CAutoTest @ 11 NONAME ; #<TI>#
+	_ZTV9CAutoTest @ 12 NONAME ; #<VT>#
+




