
diff -r 000000000000 -r 83f4b4db085c toolsandutils/autotest/bmarm/autotestu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/toolsandutils/autotest/bmarm/autotestu.def	Tue Feb 02 01:39:43 2010 +0200
@@ -0,0 +1,12 @@
+EXPORTS
+	TestCheckPointL__9CAutoTestiPci @ 1 NONAME ; CAutoTest::TestCheckPointL(int, char *, int)
+	GetString__C9CAutoTestR12CConsoleBaseR6TDes16 @ 2 NONAME R3UNUSED ; CAutoTest::GetString(CConsoleBase &, TDes16 &) const
+	KeepGoing__9CAutoTest @ 3 NONAME R3UNUSED ; CAutoTest::KeepGoing(void)
+	LogExtra__9CAutoTestPCUciGt11TRefByValue1ZC7TDesC16e @ 4 NONAME ; CAutoTest::LogExtra(unsigned char const *, int, TRefByValue<TDesC16 const>,...)
+	NewL__9CAutoTestPC13TAutoTestCaseiRC7TDesC16R5RTest @ 5 NONAME ; CAutoTest::NewL(TAutoTestCase const *, int, TDesC16 const &, RTest &)
+	Printf__9CAutoTestGt11TRefByValue1ZC7TDesC16e @ 6 NONAME ; CAutoTest::Printf(TRefByValue<TDesC16 const>,...)
+	SetCompInfo__9CAutoTestRC6TDesC8 @ 7 NONAME R3UNUSED ; CAutoTest::SetCompInfo(TDesC8 const &)
+	TestCheckPointCodeL__9CAutoTestiPci @ 8 NONAME ; CAutoTest::TestCheckPointCodeL(int, char *, int)
+	TestCheckPointCompareL__9CAutoTestiiRC7TDesC16Pci @ 9 NONAME ; CAutoTest::TestCheckPointCompareL(int, int, TDesC16 const &, char *, int)
+	ExecuteL__9CAutoTest @ 10 NONAME R3UNUSED ; CAutoTest::ExecuteL(void)
+




