
diff -r 16aa830c86c8 -r f8503e232b0c bluetoothmgmt/bluetoothclientlib/eabi/bluetoothU.def
--- a/bluetoothmgmt/bluetoothclientlib/eabi/bluetoothU.def	Wed Apr 14 17:08:52 2010 +0300
+++ b/bluetoothmgmt/bluetoothclientlib/eabi/bluetoothU.def	Tue Apr 27 17:48:21 2010 +0300
@@ -408,4 +408,5 @@
 	_ZNK12TL2CapConfig21LegacyModesDisallowedEv @ 407 NONAME
 	_ZNK12TL2CapConfig6MinMRUERi @ 408 NONAME
 	_ZNK12TL2CapConfig6MinMTUERi @ 409 NONAME
+	_ZN23CBluetoothPhysicalLinks24DisconnectAllForPowerOffEv @ 410 NONAME
 




