
diff -r 16aa830c86c8 -r f8503e232b0c bluetoothmgmt/bluetoothclientlib/bwins/BLUETOOTHU.DEF
--- a/bluetoothmgmt/bluetoothclientlib/bwins/BLUETOOTHU.DEF	Wed Apr 14 17:08:52 2010 +0300
+++ b/bluetoothmgmt/bluetoothclientlib/bwins/BLUETOOTHU.DEF	Tue Apr 27 17:48:21 2010 +0300
@@ -354,4 +354,5 @@
 	?SetMinMRU@TL2CapConfig@@QAEHG@Z @ 353 NONAME ; int TL2CapConfig::SetMinMRU(unsigned short)
 	?RetransmissionTimer@TL2CapConfig@@QBEGAAH@Z @ 354 NONAME ; unsigned short TL2CapConfig::RetransmissionTimer(int &) const
 	?MinMRU@TL2CapConfig@@QBEGAAH@Z @ 355 NONAME ; unsigned short TL2CapConfig::MinMRU(int &) const
+	?DisconnectAllForPowerOff@CBluetoothPhysicalLinks@@QAEHXZ @ 356 NONAME ; int CBluetoothPhysicalLinks::DisconnectAllForPowerOff(void)
 




