
diff -r 8bfb9186a8b8 -r 4bd5176e1bc8 browserutilities/connectionmanager/EABI/CONNECTIONMANAGERU_EKA2U.def
--- a/browserutilities/connectionmanager/EABI/CONNECTIONMANAGERU_EKA2U.def	Tue May 11 17:13:44 2010 +0300
+++ b/browserutilities/connectionmanager/EABI/CONNECTIONMANAGERU_EKA2U.def	Tue May 25 13:52:38 2010 +0300
@@ -124,3 +124,5 @@
 	_ZN26CInternetConnectionManager17SetConnectionTypeEN9CMManager23TCmSettingSelectionModeE @ 123 NONAME
 	_ZThn8_N26CInternetConnectionManager16SetRequestedSnapEm @ 124 NONAME ; #<thunk>#
 	_ZThn8_N26CInternetConnectionManager17SetConnectionTypeEN9CMManager23TCmSettingSelectionModeE @ 125 NONAME ; #<thunk>#
+	_ZN27CConnectionStageNotifierWCB17GetProgressBufferEv @ 126 NONAME
+




