
diff -r 4eb1ae11334f -r e6a39382bb9c textinput/peninputcommonctrls/eabi/peninputcommonctrlsU.DEF
--- a/textinput/peninputcommonctrls/eabi/peninputcommonctrlsU.DEF	Wed Apr 14 16:18:34 2010 +0300
+++ b/textinput/peninputcommonctrls/eabi/peninputcommonctrlsU.DEF	Tue Apr 27 16:59:43 2010 +0300
@@ -460,7 +460,7 @@
 	_ZN24CFepLayoutScrollableListC2EP12CFepUiLayouti5TSizeiiS2_S2_ @ 459 NONAME
 	_ZN25CPeninputCommonChoiceListC1EP12CFepUiLayouti11TAknsItemIDS2_22ECommonChoiceListStyle @ 460 NONAME
 	_ZN25CPeninputCommonChoiceListC2EP12CFepUiLayouti11TAknsItemIDS2_22ECommonChoiceListStyle @ 461 NONAME
-	_ZThn768_N24CFepLayoutScrollableList18HandleControlEventEiP14CFepUiBaseCtrlRK7TDesC16 @ 462 NONAME ; #<thunk>#
+	_ZThn772_N24CFepLayoutScrollableList18HandleControlEventEiP14CFepUiBaseCtrlRK7TDesC16 @ 462 NONAME ; #<thunk>#
 	_ZN23CAknFepCtrlRepeatButton18CancelPointerDownLEv @ 463 NONAME
 	_ZN20CFepCtrlDropdownList4NewLEP12CFepUiLayoutii6TPointPK5CFont5TSizeiiiiiiNS_11THDirectionEi @ 464 NONAME
 	_ZN20CFepCtrlDropdownList16SetSecondaryListER6RArrayIiEi @ 465 NONAME




