
diff -r 3a35f7917fa6 -r 5b5908ec640f buildverification/smoketest/Timew/bmarm/CONSOLEALARMALERTSERVERU.DEF
--- a/buildverification/smoketest/Timew/bmarm/CONSOLEALARMALERTSERVERU.DEF	Thu May 27 12:52:45 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,2 +0,0 @@
-EXPORTS
-	StartConsoleAlarmAlertServerL__23ConsoleAlarmAlertServerPv @1 NONAME ; public: static void __cdecl ConsoleAlarmAlertServer::StartConsoleAlarmAlertServerL(void *)




