
diff -r 6beaa9cf4752 -r 4ca382093dae buildverification/smoketest/Timew/eabi/ConsoleAlarmAlertServerU.DEF
--- a/buildverification/smoketest/Timew/eabi/ConsoleAlarmAlertServerU.DEF	Mon Feb 22 17:54:00 2010 +0200
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,11 +0,0 @@
-EXPORTS
-	_ZN23ConsoleAlarmAlertServer29StartConsoleAlarmAlertServerLEPv @ 1 NONAME
-	_ZTI24CConsoleAlarmAlertServer @ 2 NONAME ; #<TI>#
-	_ZTI25CConsoleAlarmAlertConsole @ 3 NONAME ; #<TI>#
-	_ZTI25CConsoleAlarmAlertSession @ 4 NONAME ; #<TI>#
-	_ZTI28CConsoleAlarmAlertLEDFlasher @ 5 NONAME ; #<TI>#
-	_ZTV24CConsoleAlarmAlertServer @ 6 NONAME ; #<VT>#
-	_ZTV25CConsoleAlarmAlertConsole @ 7 NONAME ; #<VT>#
-	_ZTV25CConsoleAlarmAlertSession @ 8 NONAME ; #<VT>#
-	_ZTV28CConsoleAlarmAlertLEDFlasher @ 9 NONAME ; #<VT>#
-




