
diff -r 4ca382093dae -r 493058e57c8c buildverification/smoketest/Timew/bmarm/CONSOLEALARMALERTSERVERU.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/buildverification/smoketest/Timew/bmarm/CONSOLEALARMALERTSERVERU.DEF	Wed Sep 01 12:30:50 2010 +0100
@@ -0,0 +1,2 @@
+EXPORTS
+	StartConsoleAlarmAlertServerL__23ConsoleAlarmAlertServerPv @1 NONAME ; public: static void __cdecl ConsoleAlarmAlertServer::StartConsoleAlarmAlertServerL(void *)




