EXPORTS
	??0CRichBio@@QAE@W4TRichBioMode@@@Z @ 1 NONAME ; public: __thiscall CRichBio::CRichBio(enum TRichBioMode)
	?AddItemL@CRichBio@@QAEXABVTDesC16@@0@Z @ 2 NONAME ; public: void __thiscall CRichBio::AddItemL(class TDesC16 const &,class TDesC16 const &)
	?ConstructL@CRichBio@@QAEXPBVCCoeControl@@@Z @ 3 NONAME ; public: void __thiscall CRichBio::ConstructL(class CCoeControl const *)
	?CurrentLineRect@CRichBio@@QAE?AVTRect@@XZ @ 4 NONAME ; public: class TRect  __thiscall CRichBio::CurrentLineRect(void)
	?Editor@CRichBio@@QAEAAVCEikRichTextEditor@@XZ @ 5 NONAME ; public: class CEikRichTextEditor & __thiscall CRichBio::Editor(void)
	?IsEditorBaseMode@CRichBio@@QBEHXZ @ 6 NONAME ; public: int __thiscall CRichBio::IsEditorBaseMode(void)const 
	?NewL@CRichBio@@SAPAV1@PBVCCoeControl@@W4TRichBioMode@@@Z @ 7 NONAME ; public: static class CRichBio * __cdecl CRichBio::NewL(class CCoeControl const *,enum TRichBioMode)
	?Reset@CRichBio@@QAEXXZ @ 8 NONAME ; public: void __thiscall CRichBio::Reset(void)
	?SetAndGetSizeL@CRichBio@@QAEXAAVTSize@@@Z @ 9 NONAME ; public: void __thiscall CRichBio::SetAndGetSizeL(class TSize &)
	?IsCursorLocation@CRichBio@@QBEHW4TMsgCursorLocation@@@Z @ 10 NONAME ; public: int __thiscall CRichBio::IsCursorLocation(enum TMsgCursorLocation)const 
	?VirtualHeight@CRichBio@@QAEHXZ @ 11 NONAME ; public: int __thiscall CRichBio::VirtualHeight(void)
	?VirtualVisibleTop@CRichBio@@QAEHXZ @ 12 NONAME ; public: int __thiscall CRichBio::VirtualVisibleTop(void)
	?ScrollL@CRichBio@@QAEHHW4TMsgScrollDirection@@@Z @ 13 NONAME ; int CRichBio::ScrollL(int, enum TMsgScrollDirection)
	?NotifyViewEvent@CRichBio@@QAEXW4TMsgViewEvent@@H@Z @ 14 NONAME ; void CRichBio::NotifyViewEvent(enum TMsgViewEvent, int)

